drop TABLE system.ORACHECK_read_waits;
CREATE TABLE system.ORACHECK_read_waits
(
        DTE                    DATE,
        SERVER_NAME            VARCHAR2(20),
        TABLESPACE_NAME        VARCHAR2(30),
        BLOCK                  NUMBER
)
tablespace dba_perf
STORAGE (INITIAL 2m
         NEXT    500K
         PCTINCREASE 1)
;

drop TABLE system.ORACHECK_buffer_busy_waits;
CREATE TABLE system.ORACHECK_buffer_busy_waits
(
        DTE                    DATE,
        SERVER_NAME            VARCHAR2(20),
        TABLESPACE_NAME        VARCHAR2(30),
        BLOCK                  NUMBER
)
tablespace dba_perf
STORAGE (INITIAL 2m
         NEXT    500K
         PCTINCREASE 1)
;

drop TABLE system.ORACHECK_lock_element_waits;
CREATE TABLE system.ORACHECK_lock_element_waits
(
        DTE                    DATE,
        SERVER_NAME            VARCHAR2(20),
        TABLESPACE_NAME        VARCHAR2(30),
        BLOCK                  NUMBER
)
tablespace dba_perf
STORAGE (INITIAL 2m
         NEXT    500K
         PCTINCREASE 1)
;

drop TABLE system.ORACHECK_lock_element_cleanup;
CREATE TABLE system.ORACHECK_lock_element_cleanup
(
        DTE                    DATE,
        SERVER_NAME            VARCHAR2(20),
        TABLESPACE_NAME        VARCHAR2(30),
        BLOCK                  NUMBER
)
tablespace dba_perf
STORAGE (INITIAL 2m
         NEXT    500K
         PCTINCREASE 1)
;
